sgetopt(3) sgetopt(3)

NAME

sgetopt − get option character from command line SYNTAX

#include <sgetopt.h> DESCRIPTION The sgetopt library is just like the getopt library, except that it prints errors using substdio rather than stdio.

See getopt(3) for interface details. VERSION

sgetopt version 1.9, 931201. AUTHOR

Placed into the public domain by Daniel J. Bernstein. SEE ALSO

getopt(3), subgetopt(3), subfd(3), substdio(3)