fd_move(3) fd_move(3)

NAME

fd_move − renumber a descriptor SYNTAX

#include <fd.h>

int fd_move(to,from);

int to; int from;

DESCRIPTION fd_move moves descriptor from to descriptor to. If to was already open, fd_move closes it. If the move is successful, fd_move closes from. Exception: if to and from are the same number, fd_move does nothing.

fd_move returns 0 on success, -1 on error. SEE ALSO

dup(2), fd_copy(3)